

= grampsweb

image::https://img.shields.io/badge/Version-0.1.1-informational?style=flat-square[Version: 0.1.1]
image::https://img.shields.io/badge/Version-application-informational?style=flat-square[Type: application]
image::https://img.shields.io/badge/AppVersion-23.11.0-informational?style=flat-square[AppVersion: 23.11.0]

== Usage

Helm must be installed and setup to your kubernetes cluster to use the charts.
Refer to Helm's https://helm.sh/docs[documentation] to get started.
Once Helm has been set up correctly, fetch the charts as follows:

[source,bash]
----
helm pull oci://codeberg.org/wrenix/helm-charts/grampsweb
----

You can install a chart release using the following command:

[source,bash]
----
helm install grampsweb-release oci://codeberg.org/wrenix/helm-charts/grampsweb --values values.yaml
----

To uninstall a chart release use `helm`'s delete command:

[source,bash]
----
helm uninstall grampsweb-release
----

== Values

.Values
|===
| Key | Type | Default | Description

| affinity
| object
| `{}`
|

| autoscaling.enabled
| bool
| `false`
|

| autoscaling.maxReplicas
| int
| `100`
|

| autoscaling.minReplicas
| int
| `1`
|

| autoscaling.targetCPUUtilizationPercentage
| int
| `80`
|

| fullnameOverride
| string
| `""`
|

| gramps.baseURL
| string
| `"https://gramps.example.org"`
|

| gramps.mail.from
| string
| `nil`
| "From" address for automated e-mails

| gramps.mail.host
| string
| `nil`
| SMTP server host (e.g. for sending password reset e-mails)

| gramps.mail.password
| string
| `nil`
| SMTP server password

| gramps.mail.port
| int
| `465`
| SMTP server port.

| gramps.mail.useTLS
| bool
| `true`
| Boolean, whether to use TLS for sending e-mails. Defaults to true. When using STARTTLS, set this to false and use a port different from 25.

| gramps.mail.username
| string
| `nil`
| SMTP server username

| gramps.tree
| string
| `"Gramps Web"`
|

| image.pullPolicy
| string
| `"IfNotPresent"`
|

| image.registry
| string
| `"ghcr.io"`
|

| image.repository
| string
| `"gramps-project/grampsweb"`
|

| image.tag
| string
| `""`
|

| imagePullSecrets
| list
| `[]`
|

| ingress.annotations
| object
| `{}`
|

| ingress.className
| string
| `""`
|

| ingress.enabled
| bool
| `false`
|

| ingress.hosts[0].host
| string
| `"chart-example.local"`
|

| ingress.hosts[0].paths[0].path
| string
| `"/"`
|

| ingress.hosts[0].paths[0].pathType
| string
| `"ImplementationSpecific"`
|

| ingress.tls
| list
| `[]`
|

| nameOverride
| string
| `""`
|

| nodeSelector
| object
| `{}`
|

| persistence.accessMode
| string
| `"ReadWriteOnce"`
|

| persistence.annotations
| object
| `{}`
|

| persistence.enabled
| bool
| `true`
|

| persistence.existingClaim
| string
| `nil`
| A manually managed Persistent Volume and Claim Requires persistence.enabled: true If defined, PVC must be created manually before volume will be bound

| persistence.hostPath
| string
| `nil`
| Do not create an PVC, direct use hostPath in Pod

| persistence.size
| string
| `"5Gi"`
|

| persistence.storageClass
| string
| `nil`
| Persistent Volume Storage Class If defined, storageClassName: <storageClass> If set to "-", storageClassName: "", which disables dynamic provisioning If undefined (the default) or set to null, no storageClassName spec is   set, choosing the default provisioner.  (gp2 on AWS, standard on   GKE, AWS & OpenStack)

| podAnnotations
| object
| `{}`
|

| podLabels
| object
| `{}`
|

| podSecurityContext
| object
| `{}`
|

| replicaCount
| int
| `1`
|

| resources
| object
| `{}`
|

| securityContext
| object
| `{}`
|

| service.port
| int
| `5000`
|

| service.type
| string
| `"ClusterIP"`
|

| serviceAccount.annotations
| object
| `{}`
|

| serviceAccount.automount
| bool
| `true`
|

| serviceAccount.create
| bool
| `true`
|

| serviceAccount.name
| string
| `""`
|

| tolerations
| list
| `[]`
|

| volumeMounts
| list
| `[]`
|

| volumes
| list
| `[]`
|
|===

Autogenerated from chart metadata using https://github.com/norwoodj/helm-docs[helm-docs]
