

= infra-fluxcd

image::https://img.shields.io/badge/Version-0.1.0-informational?style=flat-square[Version: 0.1.0]
image::https://img.shields.io/badge/Version-application-informational?style=flat-square[Type: application]
== Maintainers

.Maintainers
|===
| Name | Email | Url

| WrenIX
|
| <https://wrenix.eu>
|===

== Values

.Values Commons Monitoring
|===
| Key | Type | Default | Description

| commons.grafana.dashboards.labels
| object
| `{"grafana_dashboard":"1"}`
| labels of grafana dashboard configmap

| commons.prometheus.monitor.labels
| object
| `{}`
| labels on Pod- and Service-Monitor

| commons.prometheus.rules.labels
| object
| `{}`
| labels on PrometheusRules
|===
.Values Other Values
|===
| Key | Type | Default | Description

| grafana.dashboards.annotations
| object
| `{}`
| annotations of grafana dashboard configmap

| init.namespace
| string
| `"bases"`
|

| init.version
| int
| `0`
|

| prometheus.kubeStateMetricsConfig.namespace
| string
| `nil`
|
|===

Autogenerated from chart metadata using https://github.com/norwoodj/helm-docs[helm-docs]
