

= mycloud-collabora

image::https://img.shields.io/badge/Version-0.1.0-informational?style=flat-square[Version: 0.1.0]
image::https://img.shields.io/badge/Version-application-informational?style=flat-square[Type: application]
== Maintainers

.Maintainers
|===
| Name | Email | Url

| WrenIX
|
| <https://wrenix.eu>
|===

== Values

.Values
|===
| Key | Type | Default | Description

| adminPassword
| string
| `nil`
| adminPassword to access collabora admin platform

| allowedHosts
| object
| `{}`
| allowed host to use this collabora instance if not set we allow defaults (like nextcloud) example:  main.host.de: [ "alias1.host.de", "alias2.host.de" ]

| commons.grafana.dashboards.annotations
| object
| `{}`
|

| commons.grafana.dashboards.labels
| object
| `{}`
|

| commons.helm.release.driftDetection
| object
| `{}`
|

| commons.helm.release.install
| object
| `{}`
|

| commons.helm.release.test
| object
| `{}`
|

| commons.helm.release.upgrade
| object
| `{}`
|

| commons.ingress.annotations."cert-manager.io/cluster-issuer"
| string
| `"letsencrypt-prod"`
|

| commons.ingress.domain
| string
| `"wrenix.eu"`
|

| commons.ingress.tls.enabled
| bool
| `true`
| tls on every ingress

| commons.ingress.tls.override
| string
| `nil`
| use own definition of tls (e.g. for own or wildcard certificate)

| commons.masterPassword
| string
| `"CHANGEME"`
|

| commons.prometheus.monitor.labels
| object
| `{}`
|

| commons.prometheus.rules.labels
| object
| `{}`
|

| ingress.annotations
| string
| `nil`
|

| ingress.host
| string
| `nil`
| default: fs.(Values.commons.ingress.domain)

| init.namespace
| string
| `"bases"`
|

| init.version
| int
| `0`
|
|===

Autogenerated from chart metadata using https://github.com/norwoodj/helm-docs[helm-docs]
